. If you plan to use the sample {kib} dashboards provided with {beatname_uc},
configure the {kib} endpoint. You can skip this step if {kib} is running on
the same host as {es}.
+
[source,yaml]
----------------------------------------------------------------------
setup.kibana:
  host: "mykibanahost:5601" <1>
----------------------------------------------------------------------
<1> The hostname and port of the machine where {kib} is running,
for example, `mykibanahost:5601`. If you specify a path after the port number,
include the scheme and port: `http://mykibanahost:5601/path`.
