[[configuration-general-options]]
== Specify general settings

IMPORTANT: This documentation is placeholder content. It has not yet been reviewed.

You can specify settings in the +{beatname_lc}.yml+ config file to control the
general behavior of {beatname_uc}.

include::../../libbeat/docs/generalconfig.asciidoc[]

