This module periodically fetches metrics from https://nginx.org/[Nginx] servers.

The default metricset is `stubstatus`.


[float]
=== Compatibility

The Nginx metricsets were tested with Nginx 1.9 and are expected to work with all version
>= 1.9.

[float]
=== Dashboard

The nginx module comes with a predefined dashboard. For example:

image::./images/metricbeat-nginx.png[]
