This is the munin module.

The default metricset is `node`.

[float]
=== Compatibility

Munin module should be compatible with any implementation of the munin network
protocol (http://guide.munin-monitoring.org/en/latest/master/network-protocol.html),
it is tested with munin node 2.0.
