This is the Etcd Module. The Etcd module uses https://coreos.com/etcd/docs/latest/v2/api.html [Etcd v2 API] to collect metrics.

The default metricsets are `leader`, `self` and `store`.

[float]
=== Compatibility

The etcd module is tested with etcd 3.2.
