The Ceph module collects metrics by submitting HTTP GET requests to
the http://docs.ceph.com/docs/master/man/8/ceph-rest-api/[ceph-rest-api]. The default metricsets are `cluster_disk`, `cluster_health`, `monitor_health`, `pool_disk`, `osd_tree`.

[float]
=== Compatibility

The Ceph module is tested with Ceph Jewel (10.2.10).
