The Aerospike module uses the http://www.aerospike.com/docs/reference/info[Info command] to collect metrics. The default metricset is `namespace`.

[float]
=== Compatibility

The Aerospike metricsets were tested with Aerospike 3.9 and are expected to work with all versions >= 3.9.
