////
This file is generated! See scripts/docs_collector.py
////

[[metricbeat-module-dropwizard]]
== Dropwizard module

beta[]

This is the http://dropwizard.io[Dropwizard] module. The default metricset is `collector`.

[float]
=== Compability

The Dropwizard module is tested with dropwizard metrics 3.1.0.


[float]
=== Example configuration

The Dropwizard module supports the standard configuration options that are described
in <<configuration-metricbeat>>. Here is an example configuration:

[source,yaml]
----
metricbeat.modules:
- module: dropwizard
  metricsets: ["collector"]
  period: 10s
  hosts: ["localhost:8080"]
  metrics_path: /metrics/metrics
  namespace: example
  enabled: true
----

This module supports TLS connections when using `ssl` config field, as described in <<configuration-ssl>>.
It also supports the options described in <<module-http-config-options>>.

[float]
=== Metricsets

The following metricsets are available:

* <<metricbeat-metricset-dropwizard-collector,collector>>

include::dropwizard/collector.asciidoc[]

