[float]
[id="{modulename}-settings"]
==== Variable settings

Each fileset has separate variable settings for configuring the behavior of the
module. If you don’t specify variable settings, the +{modulename}+ module uses
the defaults.

For more information, see <<specify-variable-settings>>. Also see
<<advanced-settings>>.

TIP: When you specify a setting at the command line, remember to prefix the
setting with the module name, for example, +{modulename}.{fileset_ex}.var.paths+
instead of +{fileset_ex}.var.paths+.
